\documentclass[12pt,a4paper]{article}
\usepackage{fancyhdr}\usepackage{graphicx}\usepackage{placeins}\usepackage{adjustbox}
\begin{document}
\pagestyle{fancy}\fancyhf{}\chead{Short summary report}
\begin{table}[t]\centering\caption {rnaQUAST metrics for assembled transcripts. In each row the best values are indicated with \textbf{bold}. For the transcript metrics (rows 2, 3) we highlighted the best \textbf{relative} values i.e. divided by the total number of transcripts in the corresponding assembly.}\begin{adjustbox}{width=1\textwidth}\small\begin{tabular}{|l*{2}{|r}|}\hline\textbf{METRICS/TRANSCRIPTS}                            & \textbf{all\_assembled} \\ \hline\hline
\multicolumn{2}{l}{\bf BASIC TRANSCRIPTS METRICS}                                         \\ \hline
Transcripts                                             & 7693                   \\
Transcripts $>$ 500 bp                                  & \textbf{4272}          \\
Transcripts $>$ 1000 bp                                 & \textbf{1655}          \\ \hline
\end{tabular}\end{adjustbox}\end{table}
\FloatBarrier\clearpage\lfoot{generated by rnaQUAST}
\begin{figure}[t]\centering\includegraphics[width = \linewidth]{/fusion/s3/nf-core-awsmegatests/work/denovotranscript/work-9ab0f57785c37f77e05a03c8c327e35c63c8432b/5c/c7eceb0ea5ad8ac93aa0966a873919/all_assembled_output/transcript_length.png}\caption{Plot showing cumulative transcript length distribution. Each point represents the number of transcripts in the assembly with the corresponding length or longer; black dashed line corresponds to the database isoforms; the plot is given in logarithmic scale.}\end{figure}\FloatBarrier\clearpage
\end{document}